$&(’% OPERA TION REPOR T Rev.5 V er 3.1 1999 + 12 , 17/18 * Y+ 2491/2492 KSC )- : H. T omida and Y. T erada MS1201.5+2824 ! MS1231.3+1542 ! A1060-1 P ASS 1 P ASS 2 P ASS 3 P ASS 4 P ASS 5 P ass No. 991217{1545 991218{0207 Op eration X-REP SBR-A-RNG OP/OG-10 WR T TCU-MEM OP-ST AR T RNG-OFF (YOHKOH) (YOHKOH) X-REP SBR-A-RNG ST AR-02 WR T S-CTLG-CHK OBSER VE CPU2/3-STOP CPU2/3-RST GIS-MEM BA T-A-TCL- ON BA T-B-TCL- ON RNG-OFF (YOHKOH) T a rget MS1201.5+2824 MS1201.5+2824 A OS(UT) 22:20:43 03:22:05 LOS(UT) 22:32:10 03:33:36 Max-El 28.466 � 46.205 � Time 22:26:12 03:27:19 Rep- band(stat.) X ( Complete ) ( ) ( ) X ( Complete ) ( ) Rep-sta rt 22:22:03 03:22:36 DP-mo de OBS/TCU/OBS OBS/ACS/OBS/ GIS/OBS A CS-mode Normal{ Poin ting Normal{ Poin ting SUN-p os � s / � s 14.27 � /115.54 � 14.26 � /116.37 � A ttitude 2 6 4 180 : 77476 � 61 : 92939 � 349 : 63002 � 3 7 5 2 6 4 3 7 5 2 6 4 3 7 5 2 6 4 180 : 77422 � 61 : 92959 � 349 : 63036 � 3 7 5 2 6 4 3 7 5 OP-sta rt(CE) 22:29:45 ( 00h ) ( ) ( ) Cont ( 19h ) ( ) GIS HAM ERR | | A CS ERR (SH)MOMCHG ! Reset | SIS-mo de F/F 1111/3333 F/F 1111/3333 S0/1-TECT � 40 : 50 = � 40 : 45 � C � 40 : 89 = � 41 : 08 � C S0/1-CCDT � 61 : 62 = � 61 : 72 � C � 61 : 62 = � 61 : 77 � C GIS-mo de PH(10-8-8-5-0) PH(10-8-8-5-0) GIS LD Hit 22.2/22.3 c s � 1 24.6/20.9 c s � 1 P X Y R S P os MErr HV HL Gain RT- L RT- U T emp RBMT CalPk CalCnt CalTim RT Pk 10 8 8 5 0 FLF 0 3/4 48 159 218 18.6 18.0 367.49 533 14696 184.75 Pass: 991217{1545 3/4 40 159 218 12.0 390.51 498 14696 179.56 SIS Mo de Changes: MS1201.5+2824 1CCD(1111/3333) FNT/FNT, L VL OFF, ADR OFF MS1231.3+1542 1CCD(1111/3333) FNT/FNT, L VL OFF, ADR OFF A1060-1 1CCD(1111/3333) FNT/FNT, L VL OFF, ADR OFF GIS Mo de Changes: MS1201.5+2824 PH(10-8-8-5-0) MS1231.3+1542 PH(10-8-8-5-0) A1060-1 PH(10-8-8-5-0) Battery Condition (min/max) BA T V{A BA T V{B BA T I{A BA T I{B BA T T{A BA T T{B 18 : 80 = 23 : 20 18 : 90 = 23 : 20 � 5 : 98 = 4 : 75 � 5 : 03 = 4 : 78 4 : 82 = 8 : 74 9 : 03 = 10 : 19

Maneuv er Op eration Sta rt Time T a rget Name # ( � , � ) ( � , � , ) 12/18 16:30 MS1231.3+1542 1 (188 : 4683, 15 : 4262) (188 : 2376, 74 : 5793, 337 : 1408) 12/19 16:10 A1060-1 2 (158 : 8633, � 27 : 2161) (158 : 5279, 117 : 2304, 331 : 7748) Commen t: /12.0 : The SIS count rate of MS1201.5+2824 (K.Morik a w a, JPN) is 0.03 cts/sec; the GIS coun t rate is 0.03 cts/sec. 7=B9CHLgafSWWdO3>;<B5 B _"MPhSUZ#PY[QbSW4 6 mp ‘ 2 ?:S O^R [3]Y [el V\S W4 ( ] cX ) 66 IN KSC jq XYW4I N8 @DA XYW4 np3 tv_J!?:\kosguGY[E‘irSbT4 ( FK )