Plot file version 1 created 19-APR-1999 11:57:27 V vs U for M87.SPLIT.2 Source:M87 Ants * - * Stokes I IF# 1 - 2 Chan# 1

Giga Wavlngth

Giga Wavlngth

-0.4 -0.2 0.0 0.2 0.4

0.4

0.2

0.0

-0.2

-0.4