IF 1 - 2 CHAN 1 - 256 STK LL

Weight vs Time for VS01H.UVSRT.1 FG # 1

PLot file version 1 created 19-DEC-2000 15:50:45

540 520 500

HOBART - MOP ( 3 - 4 )

540 520 500

HOBART - VSOP_SC ( 3 - 6 )

540 520 500

HOBART - USUDA64 ( 3 - 8 )

Units

540 520 500

MOP - VSOP_SC ( 4 - 6 )

540 520 500

MOP - USUDA64 ( 4 - 8 )

TIME (HOURS)

06 30 07 00 30 08 00 30 09 00 30 10 00 30

540 520 500

VSOP_SC - USUDA64 ( 6 - 8 )