IF 1 - 2 CHAN 1 - 256 STK LL

Weight vs Time for VS02U.UVSRT.1 FG # 1

PLot file version 1 created 31-MAR-2000 20:39:02

540 520 500

AT - VSOP_SC ( 1 - 2 )

540 520 500

AT - HOBART ( 1 - 4 )

540 520 500

AT - MOP ( 1 - 5 )

Units

540 520 500

VSOP_SC - HOBART ( 2 - 4 )

540 520 500

VSOP_SC - MOP ( 2 - 5 )

TIME (HOURS)

1/03 30 1/04 00 30 1/05 00 30 1/06 00 30 1/07 00

540 520 500

HOBART - MOP ( 4 - 5 )