IF 1 - 2 CHAN 1 - 256 STK LL

Weight vs Time for VS03E.FIXWT.1 FG # 1

PLot file version 1 created 06-JUL-1999 18:16:24

80 70 60 50 40

VSOP_SC - SESHAN25 ( 1 - 2 )

Mega Units

120 100 80 60 40

VSOP_SC - MOP ( 1 - 3 )

TIME (HOURS)

16 00 30 17 00 30 18 00 30 19 00 30 20 00

600 500 400 300 200

SESHAN25 - MOP ( 2 - 3 )