IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 1 created 15-JUL-2006 16:44:46

4 3 2 1 0

AT - BR ( 1 - 2 )

200 100 0 -100

Janskys

3 2 1 0

AT - FD ( 1 - 3 )

200 100 0 -100 6 4 2 0

AT - HO ( 1 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 2 created 15-JUL-2006 16:44:46

3 2 1 0

AT - KP ( 1 - 6 )

200 100 0 -100

Janskys

3 2 1 0

AT - LA ( 1 - 7 )

200 100 0 -100 4 3 2 1 0

AT - MK ( 1 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 3 created 15-JUL-2006 16:44:46

6 4 2 0

AT - MP ( 1 - 9 )

200 100 0 -100

Janskys

4 3 2 1 0

AT - NL ( 1 - 10 )

200 100 0 -100 4 3 2 1 0

AT - OV ( 1 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 4 created 15-JUL-2006 16:44:46

3 2 1 0

AT - PT ( 1 - 12 )

200 100 0 -100

Janskys

8 6 4 2 0

AT - RZ ( 1 - 13 )

200 100 0 -100 2 1 0

AT - SC ( 1 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 5 created 15-JUL-2006 16:44:46

5 4 3

BR - FD ( 2 - 3 )

200 100 0 -100

Janskys

4 3 2

BR - HN ( 2 - 4 )

200 100 0 -100 4 3 2 1 0

BR - HO ( 2 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 6 created 15-JUL-2006 16:44:46 5.0 4.5 4.0 3.5 3.0

BR - KP ( 2 - 6 )

200 100 0 -100

Janskys

4 2 0

BR - LA ( 2 - 7 )

200 100 0 -100 5 4 3 2

BR - MK ( 2 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 7 created 15-JUL-2006 16:44:46

4 2 0

BR - MP ( 2 - 9 )

200 100 0 -100

Janskys

6 5 4 3

BR - NL ( 2 - 10 )

200 100 0 -100 5 4 3

BR - OV ( 2 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 8 created 15-JUL-2006 16:44:46

5.0 4.5 4.0 3.5 3.0

BR - PT ( 2 - 12 )

200 100 0 -100

Janskys

3 2 1 0

BR - RZ ( 2 - 13 )

200 100 0 -100 3.1 3.0 2.9 2.8 2.7

BR - SC ( 2 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 9 created 15-JUL-2006 16:44:46 2.8 2.6 2.4 2.2 2.0 1.8

FD - HN ( 3 - 4 )

200 100 0 -100

Janskys

8 6 4 2 0

FD - HO ( 3 - 5 )

200 100 0 -100 5 4 3

FD - KP ( 3 - 6 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 10 created 15-JUL-2006 16:44:46

4 2 0

FD - LA ( 3 - 7 )

200 100 0 -100

Janskys

4.5 4.0 3.5 3.0 2.5

FD - MK ( 3 - 8 )

200 100 0 -100 4 3 2 1 0

FD - MP ( 3 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 11 created 15-JUL-2006 16:44:46

6 5 4 3

FD - NL ( 3 - 10 )

200 100 0 -100

Janskys

5 4 3

FD - OV ( 3 - 11 )

200 100 0 -100 5 4 3

FD - PT ( 3 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 12 created 15-JUL-2006 16:44:46

3 2 1 0

FD - RZ ( 3 - 13 )

200 100 0 -100

Janskys

3.4 3.2 3.0

FD - SC ( 3 - 14 )

200 100 0 -100 8 6 4 2 0

HN - HO ( 4 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 15 created 15-JUL-2006 16:44:46

4 2 0

HN - PT ( 4 - 12 )

200 100 0 -100

Janskys

2.0 1.5 1.0 0.5 0.0

HN - RZ ( 4 - 13 )

200 100 0 -100 5 4 3 2

HN - SC ( 4 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 16 created 15-JUL-2006 16:44:46 10 5 0

HO - KP ( 5 - 6 )

200 100 0 -100

Janskys

4 3 2 1 0

HO - LA ( 5 - 7 )

200 100 0 -100 4 2 0

HO - MK ( 5 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 17 created 15-JUL-2006 16:44:46 10 5 0

HO - MP ( 5 - 9 )

200 100 0 -100

Janskys

6 4 2 0

HO - NL ( 5 - 10 )

200 100 0 -100 8 6 4 2 0

HO - OV ( 5 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 18 created 15-JUL-2006 16:44:46

6 4 2 0

HO - PT ( 5 - 12 )

200 100 0 -100

Janskys

20 10 0

HO - RZ ( 5 - 13 )

200 100 0 -100 8 6 4 2 0

HO - SC ( 5 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 19 created 15-JUL-2006 16:44:46

4 2 0

KP - LA ( 6 - 7 )

200 100 0 -100

Janskys

4.0 3.5 3.0 2.5 2.0

KP - MK ( 6 - 8 )

200 100 0 -100 3 2 1 0

KP - MP ( 6 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 20 created 15-JUL-2006 16:44:46 6 5 4 3

KP - NL ( 6 - 10 )

200 100 0 -100

Janskys

4.5 4.0 3.5 3.0

KP - OV ( 6 - 11 )

200 100 0 -100 5.0 4.5 4.0 3.5 3.0

KP - PT ( 6 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 21 created 15-JUL-2006 16:44:46

2 1 0

KP - RZ ( 6 - 13 )

200 100 0 -100

Janskys

3.5 3.0 2.5

KP - SC ( 6 - 14 )

200 100 0 -100 4 3 2 1 0

LA - MK ( 7 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 22 created 15-JUL-2006 16:44:46

3 2 1 0

LA - MP ( 7 - 9 )

200 100 0 -100

Janskys

6 4 2 0

LA - NL ( 7 - 10 )

200 100 0 -100 4 2 0

LA - OV ( 7 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 23 created 15-JUL-2006 16:44:46

4 2 0

LA - PT ( 7 - 12 )

200 100 0 -100

Janskys

2.0 1.5 1.0 0.5 0.0

LA - RZ ( 7 - 13 )

200 100 0 -100 3 2 1 0

LA - SC ( 7 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 24 created 15-JUL-2006 16:44:46

4 3 2 1 0

MK - MP ( 8 - 9 )

200 100 0 -100

Janskys

5 4 3

MK - NL ( 8 - 10 )

200 100 0 -100 4.5 4.0 3.5 3.0 2.5

MK - OV ( 8 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 25 created 15-JUL-2006 16:44:46

4.0 3.5 3.0 2.5

MK - PT ( 8 - 12 )

200 100 0 -100

Janskys

3 2 1 0

MK - RZ ( 8 - 13 )

200 100 0 -100 2.8 2.6 2.4 2.2 2.0 1.8

MK - SC ( 8 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 26 created 15-JUL-2006 16:44:46

4 3 2 1 0

MP - NL ( 9 - 10 )

200 100 0 -100

Janskys

4 3 2 1 0

MP - OV ( 9 - 11 )

200 100 0 -100 4 3 2 1 0

MP - PT ( 9 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 27 created 15-JUL-2006 16:44:46

2.0 1.5 1.0 0.5 0.0

MP - RZ ( 9 - 13 )

200 100 0 -100

Janskys

2 1 0

MP - SC ( 9 - 14 )

200 100 0 -100 6 5 4 3

NL - OV ( 10 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 30 created 15-JUL-2006 16:44:46

3 2 1 0

PT - RZ ( 12 - 13 )

200 100 0 -100

Janskys

3.8 3.6 3.4 3.2 3.0 2.8

PT - SC ( 12 - 14 )

200 100 0 -100 3 2 1 0

RZ - SC ( 13 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 31 created 15-JUL-2006 16:45:23

4 3 2 1 0

AT - BR ( 1 - 2 )

200 100 0 -100

Janskys

4 3 2 1 0

AT - FD ( 1 - 3 )

200 100 0 -100 3.0 2.5 2.0 1.5

AT - HO ( 1 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 32 created 15-JUL-2006 16:45:23

3 2 1 0

AT - KP ( 1 - 6 )

200 100 0 -100

Janskys

3 2 1 0

AT - LA ( 1 - 7 )

200 100 0 -100 4 3 2 1 0

AT - MK ( 1 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 33 created 15-JUL-2006 16:45:23

6 4 2 0

AT - MP ( 1 - 9 )

200 100 0 -100

Janskys

4 3 2 1 0

AT - NL ( 1 - 10 )

200 100 0 -100 4 3 2 1 0

AT - OV ( 1 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 34 created 15-JUL-2006 16:45:23

3 2 1 0

AT - PT ( 1 - 12 )

200 100 0 -100

Janskys

10 5 0

AT - RZ ( 1 - 13 )

200 100 0 -100 3 2 1 0

AT - SC ( 1 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 35 created 15-JUL-2006 16:45:23

5.5 5.0 4.5 4.0 3.5

BR - FD ( 2 - 3 )

200 100 0 -100

Janskys

5 4 3 2

BR - HN ( 2 - 4 )

200 100 0 -100 5 4 3 2

BR - HO ( 2 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 36 created 15-JUL-2006 16:45:23

5.0 4.5 4.0 3.5 3.0

BR - KP ( 2 - 6 )

200 100 0 -100

Janskys

4 2 0

BR - LA ( 2 - 7 )

200 100 0 -100 5 4 3

BR - MK ( 2 - 8 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 37 created 15-JUL-2006 16:45:23

4 2 0

BR - MP ( 2 - 9 )

200 100 0 -100

Janskys

6 5 4 3

BR - NL ( 2 - 10 )

200 100 0 -100 5 4 3

BR - OV ( 2 - 11 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 38 created 15-JUL-2006 16:45:23

5 4 3

BR - PT ( 2 - 12 )

200 100 0 -100

Janskys

3 2 1 0

BR - RZ ( 2 - 13 )

200 100 0 -100 3.2 3.0 2.8 2.6 2.4

BR - SC ( 2 - 14 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 39 created 15-JUL-2006 16:45:23

2.8 2.6 2.4 2.2 2.0 1.8

FD - HN ( 3 - 4 )

200 100 0 -100

Janskys

6 4 2 0

FD - HO ( 3 - 5 )

200 100 0 -100

5 4 3

FD - KP ( 3 - 6 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 40 created 15-JUL-2006 16:45:23

4 2 0

FD - LA ( 3 - 7 )

200 100 0 -100

Janskys

4.5 4.0 3.5 3.0 2.5

FD - MK ( 3 - 8 )

200 100 0 -100 4 3 2 1 0

FD - MP ( 3 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 41 created 15-JUL-2006 16:45:23

6 5 4 3

FD - NL ( 3 - 10 )

200 100 0 -100

Janskys

5 4 3

FD - OV ( 3 - 11 )

200 100 0 -100 5.5 5.0 4.5 4.0 3.5

FD - PT ( 3 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 42 created 15-JUL-2006 16:45:23

2 1 0

FD - RZ ( 3 - 13 )

200 100 0 -100

Janskys

3.5 3.0 2.5 2.0

FD - SC ( 3 - 14 )

200 100 0 -100 8 6 4 2 0

HN - HO ( 4 - 5 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 45 created 15-JUL-2006 16:45:23

2 1 0

HN - RZ ( 4 - 13 )

200 100 0 -100

Janskys

5 4 3 2

HN - SC ( 4 - 14 )

200 100 0 -100 4 3 2

HO - KP ( 5 - 6 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 46 created 15-JUL-2006 16:45:23 6 4 2 0

HO - LA ( 5 - 7 )

200 100 0 -100

Janskys

3.5 3.0 2.5 2.0 1.5

HO - MK ( 5 - 8 )

200 100 0 -100 6 4 2 0

HO - MP ( 5 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 47 created 15-JUL-2006 16:45:23

4 2 0

HO - NL ( 5 - 10 )

200 100 0 -100

Janskys

6 4 2 0

HO - OV ( 5 - 11 )

200 100 0 -100 5 4 3 2

HO - PT ( 5 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 48 created 15-JUL-2006 16:45:23

40 20 0

HO - RZ ( 5 - 13 )

200 100 0 -100

Janskys

4 2 0

HO - SC ( 5 - 14 )

200 100 0 -100 4 2 0

KP - LA ( 6 - 7 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 49 created 15-JUL-2006 16:45:23

4.0 3.5 3.0 2.5

KP - MK ( 6 - 8 )

200 100 0 -100

Janskys

4 3 2 1 0

KP - MP ( 6 - 9 )

200 100 0 -100 6 5 4 3

KP - NL ( 6 - 10 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 50 created 15-JUL-2006 16:45:23 5.0 4.5 4.0 3.5 3.0

KP - OV ( 6 - 11 )

200 100 0 -100

Janskys

5.0 4.5 4.0 3.5 3.0

KP - PT ( 6 - 12 )

200 100 0 -100 2 1 0

KP - RZ ( 6 - 13 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 51 created 15-JUL-2006 16:45:23 4.0 3.5 3.0 2.5 2.0

KP - SC ( 6 - 14 )

200 100 0 -100

Janskys

4 3 2 1 0

LA - MK ( 7 - 8 )

200 100 0 -100 3 2 1 0

LA - MP ( 7 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 52 created 15-JUL-2006 16:45:23 6 4 2 0

LA - NL ( 7 - 10 )

200 100 0 -100

Janskys

4 2 0

LA - OV ( 7 - 11 )

200 100 0 -100 4 2 0

LA - PT ( 7 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 53 created 15-JUL-2006 16:45:23

2 1 0

LA - RZ ( 7 - 13 )

200 100 0 -100

Janskys

3.5 3.0 2.5 2.0 1.5

LA - SC ( 7 - 14 )

200 100 0 -100 4 3 2 1 0

MK - MP ( 8 - 9 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 54 created 15-JUL-2006 16:45:23

5 4 3

MK - NL ( 8 - 10 )

200 100 0 -100

Janskys

5 4 3 2

MK - OV ( 8 - 11 )

200 100 0 -100 4.5 4.0 3.5 3.0 2.5

MK - PT ( 8 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 55 created 15-JUL-2006 16:45:23

2.0 1.5 1.0 0.5 0.0

MK - RZ ( 8 - 13 )

200 100 0 -100

Janskys

2.5 2.0 1.5

MK - SC ( 8 - 14 )

200 100 0 -100 4 3 2 1 0

MP - NL ( 9 - 10 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 56 created 15-JUL-2006 16:45:23

4 3 2 1 0

MP - OV ( 9 - 11 )

200 100 0 -100

Janskys

4 3 2 1 0

MP - PT ( 9 - 12 )

200 100 0 -100 1.5 1.0 0.5 0.0

MP - RZ ( 9 - 13 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 57 created 15-JUL-2006 16:45:23

2 1 0

MP - SC ( 9 - 14 )

200 100 0 -100

Janskys

6 5 4 3

NL - OV ( 10 - 11 )

200 100 0 -100 6 5 4 3

NL - PT ( 10 - 12 )

Degrees

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS03F.UVDATA.1 Vect aver. CL # 5

PLot file version 60 created 15-JUL-2006 16:45:23

4 3 2

PT - SC ( 12 - 14 )

200 100 0 -100

Janskys

3 2 1 0

RZ - SC ( 13 - 14 )

TIME (HOURS)

14 00 30 15 00 30 16 00 30 17 00 30

200 100 0 -100