Plot file version 1 created 27-MAY-1999 17:16:28 VS03L.FIXWT.1 Calibrated with CL # 4

Scalar averaged cross-power spectrum IF range: 1 - 2 Timerange: 00/23:00:00 to 00/23:10:00 Baseline: HARTRAO (01) - HOBART (02) Stokes: LL

Ampl Jy

Channels/IF

0 100 200 300 400 500

2.8 2.6 2.4 2.2 2.0 1.8 1.6 1.4 1.2 1.0

Phas deg

150 100 50 0 -50 -100 -150