IF 1 CHAN 1 - 256 STK LL

Ampltude andPhase vs Time for ASL.MULTI.1 Vect aver.

PLot file version 7 created 18-MAY-2000 10:35:46

MilliJanskys

150

145

140

135

130

HOBART - VSOP_SC ( 1 - 2 )

Degrees

TIME (HOURS)

*/06*/08*/10*/12*/14*/16*/18*/20*/22*/00*/02*/04*/06*/08*/10*/12*/14*/16*/18*/20*/22*/00*/02*/04

9 8 7 6 5 4 3 2 1 0