IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS05E.UVDATA.1 Vect aver. CL # 3

PLot file version 1 created 15-SEP-2005 20:26:45

0.8 0.6 0.4 0.2 0.0

HOBART - KASHIMA ( 1 - 2 )

200 100 0 -100

Janskys

0.8 0.6 0.4 0.2 0.0

HOBART - MOP ( 1 - 3 )

200 100 0 -100 2.0 1.5 1.0 0.5 0.0

HOBART - VSOP_SC ( 1 - 4 )

Degrees

TIME (HOURS)

10 30 11 00 30 12 00 30 13 00 30 14 00 30 15 00

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS05E.UVDATA.1 Vect aver. CL # 3

PLot file version 2 created 15-SEP-2005 20:26:46

0.6 0.4 0.2 0.0

KASHIMA - MOP ( 2 - 3 )

200 100 0 -100

Janskys

1.0 0.5 0.0

KASHIMA - VSOP_SC ( 2 - 4 )

200 100 0 -100 1.5 1.0 0.5 0.0

MOP - VSOP_SC ( 3 - 4 )

Degrees

TIME (HOURS)

10 30 11 00 30 12 00 30 13 00 30 14 00 30 15 00

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS05E.UVDATA.1 Vect aver. CL # 3

PLot file version 3 created 15-SEP-2005 20:27:17

0.8 0.6 0.4 0.2 0.0

HOBART - KASHIMA ( 1 - 2 )

200 100 0 -100

Janskys

1.0 0.5 0.0

HOBART - MOP ( 1 - 3 )

200 100 0 -100 1.5 1.0 0.5 0.0

HOBART - VSOP_SC ( 1 - 4 )

Degrees

TIME (HOURS)

10 30 11 00 30 12 00 30 13 00 30 14 00 30 15 00

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS05E.UVDATA.1 Vect aver. CL # 3

PLot file version 4 created 15-SEP-2005 20:27:17

0.6 0.4 0.2 0.0

KASHIMA - MOP ( 2 - 3 )

200 100 0 -100

Janskys

2.0 1.5 1.0 0.5 0.0

KASHIMA - VSOP_SC ( 2 - 4 )

200 100 0 -100

1.0 0.5 0.0

MOP - VSOP_SC ( 3 - 4 )

Degrees

TIME (HOURS)

10 30 11 00 30 12 00 30 13 00 30 14 00 30 15 00

200 100 0 -100