Gain amp vs UTC time for VS05H.SPLAT.1 SN 1 Lpol IF 1

Plot file version 1 created 07-AUG-1999 16:30:14

1 HARTRAO 24.330

24.325

24.320

24.315

24.310

2 VSOP_SC

Gain

TIME (HOURS)

23 00 10 20 30 40 50 1/00 00

121.160 121.158 121.156 121.154 121.152 121.150 121.148 121.146 121.144 121.142