Plot file version 1 created 07-AUG-1999 16:18:25 V vs U for VS05H.AVG30S.1 Source:J1058-80 Ants * - * Stokes I IF# 2 Chan# 1

Mega Wavlngth

Mega Wavlngth

-400 -300 -200 -100 0 100 200 300 400

400

300

200

100

0

-100

-200

-300

-400