Plot file version 3 created 07-AUG-1999 16:21:37 UV dist vs Time hrs for VS05H.AVG30S.1 Source:J1058-80 Ants * - * Stokes I IF# 2 Chan# 1

Mega Wavlngth

TIME (HOURS)

22 30 23 00 30 1/00 00 30 1/01 00

480

460

440

420

400

380

360

340

320

300