Plot file version 4 created 07-AUG-1999 16:22:33 UV pa vs Time hrs for VS05H.AVG30S.1 Source:J1058-80 Ants * - * Stokes I IF# 2 Chan# 1

Degrees

TIME (HOURS)

22 30 23 00 30 1/00 00 30 1/01 00

150

140

130

120

110

100