Plot file version 3 created 12-OCT-2005 08:30:08 V vs U for W422E.FITS.1 Source:J1058-80 Ants * - * Stokes LL IF# 1 - 2 Chan# 1 - 32

Freq = 4.8000 GHz, Bw = 16.000 MHz From 0/21:00:00 to 1/01:00:00

Giga Wavlngth

Giga Wavlngth

-0.4 -0.2 0.0 0.2 0.4

0.5

0.4

0.3

0.2

0.1

0.0

-0.1

-0.2

-0.3

-0.4

-0.5