IF 1 - 2 CHAN 1 - 256 STK LL

Weight vs Time for VS05S.FITS.1 FG # 1

PLot file version 7 created 26-OCT-2000 14:22:34 540 520 500 MOP - SESHAN25 ( 1 - 3 ) 540 520 500 MOP - KASHIMA ( 1 - 6 ) 540 520 500 NOTO - SESHAN25 ( 2 - 3 ) 540 520 500 NOTO - VSOP_SC ( 2 - 4 ) 540 520 500 NOTO - KASHIMA ( 2 - 6 ) 540 520 500 SESHAN25 - VSOP_SC ( 3 - 4 ) 540 520 500 SESHAN25 - KASHIMA ( 3 - 6 )

Units

TIME (HOURS)

17 18 19 20 21 22 23 1/00 1/01 540 520 500 VSOP_SC - KASHIMA ( 4 - 6 )