IF 1 - 2 CHAN 1 - 256 STK LL

Weight vs Time for VS06M.FIXWT.1 FG # 1

PLot file version 1 created 28-SEP-2000 13:19:26

0.12 0.10 0.08 0.06

VSOP_SC - HARTRAO ( 1 - 2 )

0.12 0.10 0.08 0.06

VSOP_SC - HOBART ( 1 - 3 )

0.10

0.05

VSOP_SC - SESHAN25 ( 1 - 4 )

Giga Units

0.8 0.6 0.4 0.2

HARTRAO - HOBART ( 2 - 3 )

0.6 0.4 0.2

HARTRAO - SESHAN25 ( 2 - 4 )

TIME (HOURS)

14 15 16 17 18 19 20

1.0 0.5 0.0

HOBART - SESHAN25 ( 3 - 4 )