IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS07I.UVDATA.1 Vect aver. CL # 4

PLot file version 1 created 19-APR-2005 18:33:24 0.4 0.2 0.0 CEDUNA - HOBART ( 1 - 2 ) 200 100 0 -100

Janskys

3 2 1 0 CEDUNA - MOP ( 1 - 3 ) 200 100 0 -100 1.0 0.5 0.0 CEDUNA - VSOP_SC ( 1 - 4 ) 200 100 0 -100 2 1 0 CEDUNA - SESHAN25 ( 1 - 5 ) 200 100 0 -100 0.4 0.2 0.0 HOBART - MOP ( 2 - 3 )

Degrees

200 100 0 -100 1.0 0.5 0.0 HOBART - VSOP_SC ( 2 - 4 )

TIME (HOURS)

15 16 17 18 19 20 21

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS07I.UVDATA.1 Vect aver. CL # 4

PLot file version 2 created 19-APR-2005 18:33:24

1.0 0.5 0.0 HOBART - SESHAN25 ( 2 - 5 ) 200 100 0 -100

Janskys

1.0 0.5 0.0 MOP - VSOP_SC ( 3 - 4 ) 200 100 0 -100 3 2 1 0 MOP - SESHAN25 ( 3 - 5 ) 200 100 0 -100 0.8 0.6 0.4 VSOP_SC - SESHAN25 ( 4 - 5 )

TIME (HOURS)

15 16 17 18 19 20 21

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS07I.UVDATA.1 Vect aver. CL # 4

PLot file version 3 created 19-APR-2005 18:34:05 0.3 0.2 0.1 0.0 CEDUNA - HOBART ( 1 - 2 ) 200 100 0 -100

Janskys

3 2 1 0 CEDUNA - MOP ( 1 - 3 ) 200 100 0 -100 1.0 0.5 0.0 CEDUNA - VSOP_SC ( 1 - 4 ) 200 100 0 -100 2 1 0 CEDUNA - SESHAN25 ( 1 - 5 ) 200 100 0 -100 0.6 0.4 0.2 0.0 HOBART - MOP ( 2 - 3 )

Degrees

200 100 0 -100 0.8 0.6 0.4 0.2 0.0 HOBART - VSOP_SC ( 2 - 4 )

TIME (HOURS)

15 16 17 18 19 20 21

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS07I.UVDATA.1 Vect aver. CL # 4

PLot file version 4 created 19-APR-2005 18:34:05 1.5 1.0 0.5 0.0 HOBART - SESHAN25 ( 2 - 5 ) 200 100 0 -100

Janskys

1.5 1.0 0.5 0.0 MOP - VSOP_SC ( 3 - 4 ) 200 100 0 -100 3 2 1 0 MOP - SESHAN25 ( 3 - 5 ) 200 100 0 -100 1.5 1.0 0.5 0.0 VSOP_SC - SESHAN25 ( 4 - 5 )

TIME (HOURS)

15 16 17 18 19 20 21

200 100 0 -100