IF 1 CHAN 1 STK LL

Weight vs Time for VS07K.AVG30S.1

PLot file version 4 created 13-AUG-1999 10:43:43

0.14 0.12 0.10 0.08 0.06 0.04

VSOP_SC - NOTO ( 1 - 2 )

MilliUnits

0.8 0.6 0.4 0.2 0.0

VSOP_SC - NRAO_140 ( 1 - 4 )

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

5 4 3 2 1 0

NOTO - NRAO_140 ( 2 - 4 )