Gain amp vs UTC time for VS08A.TASAV.1 SN 2 Lpol IF 1 - 2

Plot file version 1 created 21-SEP-2005 15:12:15

1L KASHIM34 170 168 166 164 162 160 2L MOPRA 160 155 150 145 140 135 3L HART

MilliGain

160 155 150 145 4L VSOP GZ

TIME (HOURS)

20 00 30 21 00 30 22 00 30 23 00 30 1/00 00

155 150 145 140 135