Plot file version 112 created 19-JUN-2002 15:22:36 V vs U for VS08O.FIXWT.1 Several Sources Ants * - * Stokes LL IF# 1 - 2 Chan# 1

Mega Wavlngth

Mega Wavlngth

-200 -150 -100 -50 0 50 100 150 200

100

80

60

40

20

0

-20

-40

-60

-80

-100