IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS11I1.UVDATA.1 Vect aver. CL # 4

PLot file version 1 created 29-JUL-2004 14:08:04 2.0 1.5 1.0 0.5 0.0

NOTO - HART ( 1 - 2 )

200 100 0 -100

Janskys

2 1 0

NOTO - KALYAZIN ( 1 - 3 )

200 100 0 -100

0.4 0.2 0.0

NOTO - VSOP_UZ ( 1 - 4 )

Degrees

TIME (HOURS)

01 00 30 02 00 30 03 00 30 04 00 30 05 00

200 100 0 -100

IF 1 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS11I1.UVDATA.1 Vect aver. CL # 4

PLot file version 2 created 29-JUL-2004 14:08:04 3 2 1 0

HART - KALYAZIN ( 2 - 3 )

200 100 0 -100

Janskys

0.4 0.3 0.2 0.1 0.0

HART - VSOP_UZ ( 2 - 4 )

200 100 0 -100 0.3 0.2 0.1 0.0

KALYAZIN - VSOP_UZ ( 3 - 4 )

Degrees

TIME (HOURS)

01 00 30 02 00 30 03 00 30 04 00 30 05 00

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS11I1.UVDATA.1 Vect aver. CL # 4

PLot file version 3 created 29-JUL-2004 14:08:39

2.0 1.5 1.0 0.5 0.0

NOTO - HART ( 1 - 2 )

200 100 0 -100

Janskys

2 1 0

NOTO - KALYAZIN ( 1 - 3 )

200 100 0 -100 0.8 0.6 0.4 0.2 0.0

NOTO - VSOP_UZ ( 1 - 4 )

Degrees

TIME (HOURS)

01 00 30 02 00 30 03 00 30 04 00 30 05 00

200 100 0 -100

IF 2 CHAN 1 - 128 STK LL

Ampltude andPhase vs Time for VS11I1.UVDATA.1 Vect aver. CL # 4

PLot file version 4 created 29-JUL-2004 14:08:39 3 2 1 0

HART - KALYAZIN ( 2 - 3 )

200 100 0 -100

Janskys

0.4 0.2 0.0

HART - VSOP_UZ ( 2 - 4 )

200 100 0 -100 0.3 0.2 0.1 0.0

KALYAZIN - VSOP_UZ ( 3 - 4 )

Degrees

TIME (HOURS)

01 00 30 02 00 30 03 00 30 04 00 30 05 00

200 100 0 -100