Plot file version 1 created 02-JUL-1997 01:53:28 V vs U for 1055+018.UVAVG.1 Source:1055+018 Ants * -* Stokes I IF# 1 Chn# 1

Mega Wavlngth

Mega Wavlngth

-100 -50 0 50 100

60

40

20

0

-20

-40

-60